X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/0eaad7ee985d2534e030e2d2839392435c33bba2..58db72fee358d5987139a1b8526c0ca873e07dbf:/src/views/run-process-panel/inputs/generic-input.tsx

diff --git a/src/views/run-process-panel/inputs/generic-input.tsx b/src/views/run-process-panel/inputs/generic-input.tsx
index 066bf2b8..8ca4ec89 100644
--- a/src/views/run-process-panel/inputs/generic-input.tsx
+++ b/src/views/run-process-panel/inputs/generic-input.tsx
@@ -2,10 +2,10 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { WrappedFieldProps } from 'redux-form';
 import { FormGroup, FormLabel, FormHelperText } from '@material-ui/core';
-import { GenericCommandInputParameter, getInputLabel, isRequiredInput } from '~/models/workflow';
+import { GenericCommandInputParameter, getInputLabel, isRequiredInput } from 'models/workflow';
 
 export type GenericInputProps = WrappedFieldProps & {
     commandInput: GenericCommandInputParameter<any, any>;
