X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/0c688f48e779c65c1bb849c5acd204817b295bc6..a458c32b63bfa83256ce7de1ce79b935e4838eb7:/src/views/run-process-panel/run-process-panel-root.tsx

diff --git a/src/views/run-process-panel/run-process-panel-root.tsx b/src/views/run-process-panel/run-process-panel-root.tsx
index b1a8ceab..f98660ad 100644
--- a/src/views/run-process-panel/run-process-panel-root.tsx
+++ b/src/views/run-process-panel/run-process-panel-root.tsx
@@ -28,11 +28,11 @@ export const RunProcessPanelRoot = ({ currentStep, onClick, ...props }: RunProce
         <Step>
             <StepLabel>Select inputs</StepLabel>
             <StepContent>
-                <Button onClick={() => onClick(0)}>
+                <Button color="primary" onClick={() => onClick(0)}>
                     Back
                 </Button>
                 <Button variant="contained" color="primary">
-                    Finish
+                    Run Process
                 </Button>
             </StepContent>
         </Step>
