X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/085692af7ee9809e2714edacad1251e78a196bd3..c2203b1706178b03dca89376f4cef84ccd882538:/src/components/default-code-snippet/default-code-snippet.tsx?ds=sidebyside

diff --git a/src/components/default-code-snippet/default-code-snippet.tsx b/src/components/default-code-snippet/default-code-snippet.tsx
index e8b89f32..c81865db 100644
--- a/src/components/default-code-snippet/default-code-snippet.tsx
+++ b/src/components/default-code-snippet/default-code-snippet.tsx
@@ -19,7 +19,8 @@ const theme = createMuiTheme({
         }
     },
     typography: {
-        fontFamily: 'monospace'
+        fontFamily: 'monospace',
+        useNextVariants: true,
     }
 });
 
