X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/04ddc76f953ae6c61264a9c1fa5a8cade9e1773e..58db72fee358d5987139a1b8526c0ca873e07dbf:/src/views/workbench/workbench.tsx

diff --git a/src/views/workbench/workbench.tsx b/src/views/workbench/workbench.tsx
index 64caa6ca..25d70776 100644
--- a/src/views/workbench/workbench.tsx
+++ b/src/views/workbench/workbench.tsx
@@ -127,6 +127,9 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         minWidth: 0,
         paddingLeft: theme.spacing.unit * 3,
         paddingRight: theme.spacing.unit * 3,
+        // Reserve vertical space for app bar + MainContentBar
+        minHeight: `calc(100vh - ${theme.spacing.unit * 16}px)`,
+        display: 'flex',
     }
 });
 
