X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/02fe86a56f080ed1d5770ad6c6856a15f50ab508..825ea4fce4ba3568f6105c17e83f4769a9323759:/src/views/run-process-panel/inputs/file-array-input.tsx

diff --git a/src/views/run-process-panel/inputs/file-array-input.tsx b/src/views/run-process-panel/inputs/file-array-input.tsx
index 88f8a00c..14d16824 100644
--- a/src/views/run-process-panel/inputs/file-array-input.tsx
+++ b/src/views/run-process-panel/inputs/file-array-input.tsx
@@ -193,7 +193,7 @@ const FileArrayInputComponent = connect(mapStateToProps)(
 
         chipsInput = () =>
             <ChipsInput
-                value={this.props.input.value}
+                values={this.props.input.value}
                 disabled={this.props.commandInput.disabled}
                 onChange={noop}
                 createNewValue={identity}
