X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/01a728d112f5728b9552c7e63f074487a4d056f0..825ea4fce4ba3568f6105c17e83f4769a9323759:/src/views/run-process-panel/inputs/float-array-input.tsx?ds=sidebyside

diff --git a/src/views/run-process-panel/inputs/float-array-input.tsx b/src/views/run-process-panel/inputs/float-array-input.tsx
index 225a7727..818a0518 100644
--- a/src/views/run-process-panel/inputs/float-array-input.tsx
+++ b/src/views/run-process-panel/inputs/float-array-input.tsx
@@ -46,7 +46,7 @@ class InputComponent extends React.PureComponent<GenericInputProps>{
             deletable={!commandInput.disabled}
             orderable={!commandInput.disabled}
             disabled={commandInput.disabled}
-            value={input.value}
+            values={input.value}
             onChange={this.handleChange}
             createNewValue={parseFloat}
             inputComponent={FloatInput}
