X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/00b22552554ddcae9cf3b68ed4017067555ba02e..refs/heads/18207-Workbench2-is-not-clearing-the-project-content-when-switching:/src/components/data-table-default-view/data-table-default-view.tsx

diff --git a/src/components/data-table-default-view/data-table-default-view.tsx b/src/components/data-table-default-view/data-table-default-view.tsx
index 9f674b94..2869ab82 100644
--- a/src/components/data-table-default-view/data-table-default-view.tsx
+++ b/src/components/data-table-default-view/data-table-default-view.tsx
@@ -2,11 +2,11 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { StyleRulesCallback, WithStyles, withStyles } from '@material-ui/core/styles';
-import { DefaultViewDataProps, DefaultView } from '~/components/default-view/default-view';
-import { ArvadosTheme } from '~/common/custom-theme';
-import { DetailsIcon } from '~/components/icon/icon';
+import { DefaultViewDataProps, DefaultView } from 'components/default-view/default-view';
+import { ArvadosTheme } from 'common/custom-theme';
+import { DetailsIcon } from 'components/icon/icon';
 
 type CssRules = 'classRoot';
 
